Figure 1: A triangle mesh at variable resolution extracted from the MT for Mount Marcy: top view, prespective wireframe, and solid; the viewpoint is the red point on the middle of the left edge in the top view. The full resolution mesh contains 50562 triangles, this mesh only 6322; the average extraction times for different viewpoint positions were about 100 milliseconds.

69451 triangles 5781 triangles, extracted in 0.0164 secs

67656 triangles 24361 triangles, extracted in 0.0436 secs

67656 triangles 6074 triangles, extracted in 0.0138 secs

Figure 2: Triangle meshes extracted from MTs for free-form surfaces: original mesh at full resolution (left), and mesh at variable resolution (wireframe and solid); the focus point is the red point.